<script>
import Vue from "vue";
// 移除全局预览弹窗方法导入

export default {
  data() {
    return {
      isFirstLaunch: true, // 添加标志变量，用于标记是否是首次启动
    }
  },
  onLaunch: function () {
    console.log("App Launch");
    // #ifdef MP-WEIXIN
    const updateManager = uni.getUpdateManager();

    updateManager.onCheckForUpdate(function (res) {
      // 请求完新版本信息的回调
      console.log(res.hasUpdate);
    });

    updateManager.onUpdateReady(function (res) {
      uni.showModal({
        title: "更新提示",
        content: "新版本已经准备好，是否重启应用？",
        success(res) {
          if (res.confirm) {
            // 新的版本已经下载好，调用 applyUpdate 应用新版本并重启
            updateManager.applyUpdate();
          }
        },
      });
    });

    updateManager.onUpdateFailed(function (res) {
      // 新的版本下载失败
    });
    //#endif
    var that = this;

    this.$config.init().then(async (data) => {
      //加载配置
      let src = await that.$config.getAppSettingAsync("win_audio");
      if (src == null || src == "") {
        src = that.$img("/static/mp3/open.mp3");
      }
      //创建中奖音乐
      const openBgm = uni.createInnerAudioContext();
      Vue.prototype.bgmCtx = {};
      Vue.prototype.bgmCtx.openBgm = openBgm;
      openBgm.src = src;
    });

    // 调用登录记录接口
    this.callLoginRecordApi();

    /* 重置首页公告弹窗状态 */
    uni.setStorageSync("_is_this_show", false);

    /* 清除缓存中的广告id */
    uni.removeStorageSync("_ad_id");
    /* 清除缓存中的click_id */
    uni.removeStorageSync("_click_id");
  },
  onShow: function () {
    console.log("App Show");
    // // 如果不是首次启动才调用登录记录接口，避免与onLaunch重复调用，有问题，当用户分享的时候，会频繁触发
    // if (!this.isFirstLaunch) {
    //   this.callLoginRecordApi();
    // } else {
    //   this.isFirstLaunch = false; // 重置标志
    // }
  },
  onHide: function () {
    console.log("App Hide");
  },
  methods: {
    // 调用登录记录接口的方法
    callLoginRecordApi() {
      // 检查用户是否已登录
      const token = uni.getStorageSync('token');
      if (!token) {
        console.log('用户未登录，不调用登录记录接口');
        return;
      }
      this.req({
        url: 'login_record',
        method: 'POST',
        success: (res) => {
          console.log('登录记录接口调用成功', res);
        },
        fail: (err) => {
          console.log('登录记录接口调用失败', err);
        }
      });
    }
  }
};
</script>

<style lang="scss">
/*每个页面公共css */
@import "./common/animate.css";
@import url("./common/common.css");
@import url("/components/gaoyia-parse/parse.css");

/* 引入字体 */
@font-face {
  font-family: "YouSheBiaoTiHei";
  src: url($imgurl + "font/YouSheBiaoTiHei.ttf") format("truetype");
}

@font-face {
  font-family: "zihun152hao-jijiachaojihei";
  src: url($imgurl + "font/zihun152hao-jijiachaojihei.TTF") format("truetype");
}

@font-face {
  font-family: "zihun147hao-xingyuanhei";
  src: url($imgurl + "font/zihun147hao-xingyuanhei.TTF") format("truetype");
}

page {
  overflow-x: hidden;

  &:before {
    content: "";
    position: fixed;
    z-index: -1;
    top: 0;
    right: 0;
    bottom: 0;
    left: 0;
    background-color: #1c1b20;
  }
}

.ziti {
  font-family: YouSheBiaoTiHei;
}

.flex_center {
  display: flex;
  align-items: center;
}

.hang2 {
  overflow: hidden;
  text-overflow: ellipsis;
  display: -webkit-box;
  -webkit-line-clamp: 2;
  -webkit-box-orient: vertical;
  word-wrap: break-word;
  word-break: break-all;
}

.hang1 {
  overflow: hidden;
  /*超出部分隐藏*/
  white-space: nowrap;
  /*不换行*/
  text-overflow: ellipsis;
  /*超出部分文字以...显示*/
}

.icon {
  display: flex;
  justify-content: center;
  align-items: center;

  image {
    width: 100%;
    height: 100%;
  }
}

.common_bg {
  background-repeat: no-repeat;
  background-position: 0 0;
  background-size: 100% 100%;
}

.relative {
  position: relative;
}

button.hide {
  position: absolute;
  width: 100% !important;
  height: 100% !important;
  left: 0;
  top: 0;
  z-index: 1;
  opacity: 0;
}

/* 重写组件样式 */
/deep/.uni-noticebar {
  padding: 0 !important;
  margin: 0 !important;
}

/deep/.mescroll-upwarp {
  box-sizing: border-box;
  min-height: 55px;
  padding: 15px 0;
  text-align: center;
  clear: both;
}

/deep/.cmd-progress-outer {
  line-height: 0;

  .cmd-progress-bg {
    margin: 0 !important;
  }
}

.uni-tabbar__bd {
  height: 50px !important;
}

.uni-tabbar__icon {
  height: 50px !important;
}

@keyframes m-zoom {
	0% {
		transform: scale(1);
	}

	50% {
		transform: scale(0.9);
	}

	100% {
		transform: scale(1);
	}
}

</style>
